Individual Cap HistoAll 616

Bin Frequency

0 120

261 5

262 15

263 21

264 39

265 61

266 64

267 70

268 54

269 20

270 10

271 2

272 1

273 0

274 1

275 0

276 0

277 0

278 0

279 0

280 0

More 1

0

10

20

30

40

50

60

70

261262263264265266267268269270271272273274275276277278279280

Individual Cap HistoAll 616

261262263264265266267268269270271272273274275276277278279280

Series1